80 100 120 140 160 180

0.01

0.02

0.03

0.04

0.05

Arizona Dust

80 100 120 140 160 180 1.5 2 2.5 3 3.5 4 x 10_{-3} Chaetoceros

80 100 120 140 160 180 4 5 6 7 8 x 10_{-3}

Volume Scattering Function (m

-1 sr-1)

DRE

80 100 120 140 160 180 0.8 1 1.2 1.4 1.6 x 10_{-3}

Scattering Angle (Degrees)

Platymonas